From f14177ce6c1df5412305e6c5cd774aefdfdc0bb0 Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.me>
Date: Wed, 20 Sep 2023 15:28:37 -0700
Subject: feat(settings): limit list height

---
 src/routes/settings/+page.svelte | 8 +++++++-
 1 file changed, 7 insertions(+), 1 deletion(-)

(limited to 'src/routes/settings/+page.svelte')

diff --git a/src/routes/settings/+page.svelte b/src/routes/settings/+page.svelte
index 8ec56788..9707ec33 100644
--- a/src/routes/settings/+page.svelte
+++ b/src/routes/settings/+page.svelte
@@ -58,9 +58,15 @@
 			on={'Link anime to LiveChart.me'}
 			off={'Link anime to AniList'}
 		/>
-		<SettingToggle setting={'displayPausedMedia'} on={'Hide'} off={'Show'} sectionBreak>
+		<SettingToggle setting={'displayPausedMedia'} on={'Hide'} off={'Show'}>
 			paused media
 		</SettingToggle>
+		<SettingToggle
+			setting={'limitListHeight'}
+			on={'Display full list area'}
+			off={'Limit list area to screen'}
+			sectionBreak
+		/>
 
 		<p />
 
-- 
cgit v1.2.3

