From be9a02cd3cbbda885a478fabd373ed8afff6cc06 Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.me>
Date: Mon, 6 Nov 2023 10:50:31 -0800
Subject: feat(manga): option to disable volume ood

---
 src/routes/settings/+page.svelte | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)

(limited to 'src/routes/settings/+page.svelte')

diff --git a/src/routes/settings/+page.svelte b/src/routes/settings/+page.svelte
index aafb7853..50c5ac28 100644
--- a/src/routes/settings/+page.svelte
+++ b/src/routes/settings/+page.svelte
@@ -96,6 +96,23 @@
 
 		<br />
 
+		<SettingCheckboxToggle
+			setting="disableOutOfDateVolumeWarning"
+			text="Disable out-of-date volume warning"
+		>
+			<SettingHint lineBreak>
+				Keeping this enabled displays a warning message when there is a mismatch between chapter
+				progress and the number of volumes you have completed for a given title. (e.g. you are on
+				Vol. 5 Ch. 50, but only have 3 volumes tracked when you should have 4)
+
+				<br />
+
+				Disabling this option speeds up refresh times for manga lists.
+			</SettingHint>
+		</SettingCheckboxToggle>
+
+		<br />
+
 		<SettingCheckboxToggle setting="disableGuessing" text="Disable informed chapter estimation">
 			<SettingHint lineBreak>
 				Enabling this setting will disable light novel chapter counts and may cause inaccuracy in
-- 
cgit v1.2.3

