From ac3103002c78801076eb81038c804e637c0b66f7 Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.net>
Date: Fri, 15 May 2026 13:44:05 +0000
Subject: ui(settings): collapse the debug panel by default

---
 src/routes/settings/+page.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/routes/settings/+page.svelte')

diff --git a/src/routes/settings/+page.svelte b/src/routes/settings/+page.svelte
index 33c7b096..c93f4dc9 100644
--- a/src/routes/settings/+page.svelte
+++ b/src/routes/settings/+page.svelte
@@ -77,7 +77,7 @@ export let data: PageData;
   <Category title={$locale().settings.display.title}><Display /></Category>
   <Category title={$locale().settings.calculation.title}><Calculation /></Category>
   <Category title={$locale().settings.cache.title}><Cache /></Category>
-  <Category id="debug">
+  <Category id="debug" open={false}>
     <summary>
       {$locale().settings.debug.title}
       <button
-- 
cgit v1.2.3

