From 76d710493e2496490f9e2f9894cf581757f4d92e Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.net>
Date: Tue, 2 Jun 2026 12:59:04 +0000
Subject: fix(security): replace RSS feed URL tokens with encrypted token (M5)

---
 src/routes/settings/+page.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/routes/settings/+page.svelte')

diff --git a/src/routes/settings/+page.svelte b/src/routes/settings/+page.svelte
index 79642944..9a3bf990 100644
--- a/src/routes/settings/+page.svelte
+++ b/src/routes/settings/+page.svelte
@@ -55,7 +55,7 @@ export let data: PageData;
       <SettingSync />
     </Category>
     <Category title={$locale().settings.rssFeeds.title} id="feeds" newLine={false}>
-      <RssFeeds user={data.user} />
+      <RssFeeds feedToken={data.feedToken} />
     </Category>
   </div>
 
-- 
cgit v1.2.3

