From 38ebbd6af911a0c91a3a3d7db1c50261e2398010 Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.me>
Date: Sat, 23 Sep 2023 01:40:36 -0700
Subject: fix(settings): temporarily disable height limit

---
 src/routes/+page.svelte | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/routes/+page.svelte')

diff --git a/src/routes/+page.svelte b/src/routes/+page.svelte
index 47865e68..ee021e1d 100644
--- a/src/routes/+page.svelte
+++ b/src/routes/+page.svelte
@@ -15,6 +15,8 @@
 	let lastActivityWasToday = true;
 
 	onMount(async () => {
+		settings.setKey('limitListHeight', false);
+
 		if ($settings.limitListHeight) {
 			document.querySelectorAll('.list').forEach((list) => {
 				(list as HTMLElement).style.maxHeight = `calc(100vh - ${
-- 
cgit v1.2.3

