From 0912e33cb00960173d595a262601707da2a1410a Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.net>
Date: Sun, 19 Apr 2026 11:00:13 +0000
Subject: Revert "fix(tooltip): park measurement node off-screen to stop body
 resize"

This reverts commit 6865cae76cb88aa78d7c297c637557468fdce8fc.
---
 src/lib/Tooltip/LinkedTooltip.svelte | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'src/lib/Tooltip/LinkedTooltip.svelte')

diff --git a/src/lib/Tooltip/LinkedTooltip.svelte b/src/lib/Tooltip/LinkedTooltip.svelte
index fb4faa4f..b3fc6ae2 100644
--- a/src/lib/Tooltip/LinkedTooltip.svelte
+++ b/src/lib/Tooltip/LinkedTooltip.svelte
@@ -36,9 +36,6 @@ const createTooltip = () => {
 	if (!tooltipDiv) {
 		tooltipDiv = document.createElement("div");
 		tooltipDiv.style.position = "absolute";
-		tooltipDiv.style.left = "-9999px";
-		tooltipDiv.style.top = "-9999px";
-		tooltipDiv.style.visibility = "hidden";
 		tooltipDiv.style.zIndex = "1000";
 		opacity = 0;
 		tooltipDiv.style.pointerEvents = "none";
-- 
cgit v1.2.3

