From 286c75a6e0d810894bfee2c5c80b747c31f6f082 Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.me>
Date: Sun, 11 Feb 2024 04:07:46 -0800
Subject: refactor: remove wikipedia for rate-limit

---
 src/lib/Tools/EpisodeDiscussionCollector.svelte | 7 +------
 1 file changed, 1 insertion(+), 6 deletions(-)

(limited to 'src/lib/Tools/EpisodeDiscussionCollector.svelte')

diff --git a/src/lib/Tools/EpisodeDiscussionCollector.svelte b/src/lib/Tools/EpisodeDiscussionCollector.svelte
index cebea553..4e38161e 100644
--- a/src/lib/Tools/EpisodeDiscussionCollector.svelte
+++ b/src/lib/Tools/EpisodeDiscussionCollector.svelte
@@ -71,12 +71,7 @@
 				{/each}
 			</ul>
 		{:catch}
-			<p>
-				Threads could not be loaded. You might have been <a
-					href="https://en.wikipedia.org/wiki/Rate_limiting"
-					target="_blank">rate limited</a
-				>.
-			</p>
+			<p>Threads could not be loaded. You might have been rate-limited.</p>
 			<p>
 				Try again in a few minutes. If the problem persists, please contact <a
 					href="https://anilist.co/user/fuwn"
-- 
cgit v1.2.3

