From effe9f3133313ab033f2f12afece6eaedc01cb5f Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.net>
Date: Fri, 17 Apr 2026 15:05:47 +0000
Subject: fix(ui): hide list count badge when no media is displayed

Showing "0" in the list title next to a "No anime/manga to display"
empty-state message duplicates information. Treat an empty media list
the same as dummy mode and suppress the count.
---
 src/lib/List/Manga/CleanMangaList.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/lib/List/Manga/CleanMangaList.svelte')

diff --git a/src/lib/List/Manga/CleanMangaList.svelte b/src/lib/List/Manga/CleanMangaList.svelte
index 9f24bbdd..a52a9d7e 100644
--- a/src/lib/List/Manga/CleanMangaList.svelte
+++ b/src/lib/List/Manga/CleanMangaList.svelte
@@ -140,7 +140,7 @@ const increment = (manga: Media) => {
       ? $locale().lists.due.mangaAndLightNovels
       : $locale().lists.completed.mangaAndLightNovels}
     hideTime={dummy}
-    hideCount={dummy}
+    hideCount={dummy || media.length === 0}
   >
     {#if !dummy}
       <button
-- 
cgit v1.2.3

