From d397b10e2a58097c7cf4cdc978a1fdc6b244753a Mon Sep 17 00:00:00 2001
From: Fuwn <contact@fuwn.me>
Date: Sun, 5 Nov 2023 18:32:16 -0800
Subject: refactor(manga): change wording for refresh

---
 src/lib/List/CleanMangaList.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/lib/List/CleanMangaList.svelte')

diff --git a/src/lib/List/CleanMangaList.svelte b/src/lib/List/CleanMangaList.svelte
index a046ecc0..434f37d6 100644
--- a/src/lib/List/CleanMangaList.svelte
+++ b/src/lib/List/CleanMangaList.svelte
@@ -19,7 +19,7 @@
 </script>
 
 <ListTitle count={media.length} time={endTime / 1000}>
-	<a href={'#'} title="Force a refresh" on:click={cleanCache}>Force</a>
+	<a href={'#'} title="Force a full refresh" on:click={cleanCache}>Refresh</a>
 </ListTitle>
 
 {#if media.length === 0}
-- 
cgit v1.2.3

